\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage{libertine}

\usepackage{tabulary}
\usepackage{varioref}
\usepackage{graphicx}
\usepackage{multirow}

\usepackage[bookmarks=true,
        bookmarksnumbered=true,
        pdfpagemode=UseOutlines,
        pdfstartview={FitV 0},
        pdffitwindow=true,
        colorlinks=true,
        linkcolor=black,
        citecolor=black,
        filecolor=black,
        urlcolor=black,
        pdfauthor={Anna Christina Nass},
        pdftitle={VT132 Manual},
        pdfsubject={Documentation},
        pdfkeywords={VT132}
        ]{hyperref}

% Give a little room between table rows:
\renewcommand{\arraystretch}{1.2}
% The TOC should only contain Chapters and Sections:
\setcounter{tocdepth}{\sectiontocdepth}
